-- Add per-profile retention settings
ALTER TABLE `#__mokosuitebackup_profiles`
  ADD COLUMN `retention_days` INT(11) NOT NULL DEFAULT 0 COMMENT '0 = use global default' AFTER `notify_on_failure`,
  ADD COLUMN `retention_count` INT(11) NOT NULL DEFAULT 0 COMMENT '0 = use global default' AFTER `retention_days`;
